/* FreeBSD config exception file  */


          SHELL = /bin/sh
             CC = cc
            F77 = ${WRKDIR}/bin/fc1
           VF77 = $(F77)
            VCC = $(CC)
         RATFOR = ratfor
       CMINUS_C = -c
       FMINUS_C = -c
      VCMINUS_C = -c
      VFMINUS_C = -c
            CPP = /usr/bin/cpp
        INSTALL = install -c -m
             RM = rm -f
          RMDIR = rm -rf
          MKDIR = mkdir
          CHMOD = chmod
             MV = mv
             CP = cp
             LN = ln -s
         RANLIB = ranlib
RANLIBINSTFLAGS = -t
             AR = ar clq
           LINT = lint
       LINTOPTS = -axz
           MAKE = make
          NROFF = nroff
       MANFLAGS = -man
     NROFF_FILT = | colcrt -

/* the following have been adapted from spice 3f5 port */
/*
MAKE            = /usr/bin/make
INTERFACE_OPTS  = -DWANT_X11
CC              = gcc
CC_OPT          = -O2 -pipe
CC_OPT_SAFE     = -O2 -fno-strength-reduce -pipe
LDFLAGS         = -L$(X11BASE)/lib -lm -ltermcap
ASM_HACK        = < /dev/null
SYS_CFLAGS      = -Dbsd
*/
#define MathLib -lm
#define FpaFlag 
#define ManDir ${PREFIX}/man/manl
#define SysIncludes -I${X11BASE}/include

#ifdef DEBUG
# define F_O()                                                          @@\
.F.OBJ_EXT:                                                             @@\
        $(F77) -F -Qoption cpp -P $(FFLAGS) $*.F                        @@\
        $(F77) $(FMINUS_C) $(FFLAGS) $*.f
#endif

