From 6e87e3e1ac1eb6200b9f6797890b7e42efefae5d Mon Sep 17 00:00:00 2001
From: fragosti <francesco.agosti93@gmail.com>
Date: Tue, 3 Jul 2018 18:05:00 -0700
Subject: Fix issue where onboarding doesn't scroll to wallet when starting
 from relayers page

---
 packages/website/ts/components/portal/portal.tsx | 2 +-
 1 file changed, 1 insertion(+), 1 deletion(-)

(limited to 'packages/website/ts/components/portal/portal.tsx')

diff --git a/packages/website/ts/components/portal/portal.tsx b/packages/website/ts/components/portal/portal.tsx
index 2498fb928..1adbc86cd 100644
--- a/packages/website/ts/components/portal/portal.tsx
+++ b/packages/website/ts/components/portal/portal.tsx
@@ -320,7 +320,7 @@ export class Portal extends React.Component<PortalProps, PortalState> {
     private _renderWallet(): React.ReactNode {
         const isMobile = utils.isMobileWidth(this.props.screenWidth);
         // We need room to scroll down for mobile onboarding
-        const marginBottom = isMobile ? '200px' : '15px';
+        const marginBottom = isMobile ? '250px' : '15px';
         return (
             <div>
                 <Container className="flex flex-column items-center">
-- 
cgit 

